Run/Frame -->

Overall scale and R(int) variations for gore001

Normalized Scale Factor

Smoothed R(int)%

0.6

0.8

1.0

1.2

1.4

3 4 5 6 7 8 9 10 11 12

0 1 2 3 4 5 6 7

Intensity statistics for gore001

R(int) blue, R(sigma) red

Resolution d[Å]

Resolution d[Å]

R(int) or R(sigma)% |E²-1| for general hkl

0.9 1.0 1.1 1.3 1.5 1.9 2.7

0.9 1.0 1.1 1.3 1.5 1.9 2.7

1 2 3 4 5

0.2 0.4 0.6 0.8 1.0 1.2

Chi-squared distributions for gore001

Chi-squared = Mean of { N·Sum[I-<I>]² / (N-1)·Sum[su²(I)] } (N equivalents)

Resolution d[Å]

Intensity quantiles

Chi-squared Chi-squared

0.9 1.0 1.1 1.3 1.5 1.9 2.7

1

1

2

2

3

3

4

4

5

5

0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

Spatial distribution of (I-<I>)/su for gore001

Scan 3, detector 2-theta -84.57°, |I-<I>| >3.00su (red+, blue-), errors (black)

50

50

100

100

150

150

200

200

250

250

300

300

350

350

400

400

450

450

Y ->

X ->

Spatial distribution of (I-<I>)/su for gore001

Scan 4, detector 2-theta -84.57°, |I-<I>| >3.00su (red+, blue-), errors (black)

50

50

100

100

150

150

200

200

250

250

300

300

350

350

400

400

450

450

Y ->

X ->

Spatial distribution of (I-<I>)/su for gore001

Scan 5, detector 2-theta -84.57°, |I-<I>| >3.00su (red+, blue-), errors (black)

50

50

100

100

150

150

200

200

250

250

300

300

350

350

400

400

450

450

Y ->

X ->

Spatial distribution of (I-<I>)/su for gore001

Scan 6, detector 2-theta -84.57°, |I-<I>| >3.00su (red+, blue-), errors (black)

50

50

100

100

150

150

200

200

250

250

300

300

350

350

400

400

450

450

Y ->

X ->

Spatial distribution of (I-<I>)/su for gore001

Scan 7, detector 2-theta -84.57°, |I-<I>| >3.00su (red+, blue-), errors (black)

50

50

100

100

150

150

200

200

250

250

300

300

350

350

400

400

450

450

Y ->

X ->

Spatial distribution of (I-<I>)/su for gore001

Scan 8, detector 2-theta -84.57°, |I-<I>| >3.00su (red+, blue-), errors (black)

50

50

100

100

150

150

200

200

250

250

300

300

350

350

400

400

450

450

Y ->

X ->

Spatial distribution of (I-<I>)/su for gore001

Scan 9, detector 2-theta -84.57°, |I-<I>| >3.00su (red+, blue-), errors (black)

50

50

100

100

150

150

200

200

250

250

300

300

350

350

400

400

450

450

Y ->

X ->

Spatial distribution of (I-<I>)/su for gore001

Scan 10, detector 2-theta 62.55°, |I-<I>| >3.00su (red+, blue-), errors (black)

50

50

100

100

150

150

200

200

250

250

300

300

350

350

400

400

450

450

Y ->

X ->

Spatial distribution of (I-<I>)/su for gore001

Scan 11, detector 2-theta 62.55°, |I-<I>| >3.00su (red+, blue-), errors (black)

50

50

100

100

150

150

200

200

250

250

300

300

350

350

400

400

450

450

Y ->

X ->

Spatial distribution of (I-<I>)/su for gore001

Scan 12, detector 2-theta 62.55°, |I-<I>| >3.00su (red+, blue-), errors (black)

50

50

100

100

150

150

200

200

250

250

300

300

350

350

400

400

450

450

Y ->

X ->

I/sig(I) against log10(I) for gore001

Diederichs, K., Acta Cryst. D66 (2010) 733-740

Log10(I)

I/sig(I)

0

10

20

30

40

50

60

-1 0 1 2 3 4 5 6 7 8