TITL jsib001 in P2(1)2(1)2(1)
CELL 0.71073  10.0096  12.4633  16.4230  90.000  90.000  90.000
ZERR    4.00   0.0041   0.0050   0.0065   0.000   0.000   0.000
LATT -1
SYMM 0.5-X, -Y, 0.5+Z
SYMM -X, 0.5+Y, 0.5-Z
SYMM 0.5+X, 0.5-Y, -Z
SFAC C H N O F NA P
UNIT 64 104 8 12 24 4 4
TEMP -153
SIZE 0.08 0.10 0.20
 
L.S. 20
BOND $H
FMAP 2
PLAN 20
ACTA 50
TWIN
CONF
WPDB
WGHT    0.036400    0.013800
MOVE 1 1 1 -1
BASF   0.4
FVAR       0.72760
NA    6    0.002599    0.088569    0.139451    11.00000    0.02425    0.02873 =
         0.02447    0.00011   -0.00076   -0.00328
O1    4    0.097751    0.025888    0.264895    11.00000    0.03261    0.04473 =
         0.02789    0.00068   -0.00905   -0.00367
O2    4    0.071945    0.238775    0.219526    11.00000    0.03883    0.03981 =
         0.02837   -0.00351   -0.00790   -0.00708
O3    4    0.074129    0.235777    0.053089    11.00000    0.03665    0.02148 =
         0.03386   -0.00424    0.00103   -0.00120
P1    7   -0.312031    0.071653    0.197955    11.00000    0.02386    0.03153 =
         0.02524    0.00686    0.00116    0.00040
F1    5   -0.427639    0.154529    0.218811    11.00000    0.04084    0.04204 =
         0.03785    0.00249    0.00706    0.01246
F2    5   -0.384167    0.041214    0.114569    11.00000    0.02668    0.03471 =
         0.03232    0.00502   -0.00574   -0.00189
F3    5   -0.389617   -0.022452    0.243423    11.00000    0.03657    0.04110 =
         0.04260    0.01841    0.01167   -0.00279
F4    5   -0.191855   -0.010287    0.175132    11.00000    0.02714    0.03433 =
         0.03490    0.00868    0.00211    0.00422
F5    5   -0.236601    0.101228    0.280625    11.00000    0.04438    0.05723 =
         0.02566    0.00274   -0.00661   -0.00261
F6    5   -0.229617    0.165051    0.151408    11.00000    0.03370    0.02648 =
         0.03494    0.00688    0.00107   -0.00557
N1    3    0.178982   -0.046126    0.105896    11.00000    0.02316    0.03425 =
         0.02804    0.00305   -0.00706   -0.00016
N2    3   -0.012609    0.035910   -0.008205    11.00000    0.02231    0.02110 =
         0.02233    0.00311    0.00055    0.00050
C1    1    0.047233   -0.069030   -0.019992    11.00000    0.01979    0.02662 =
         0.02432    0.00123    0.00348   -0.00144
C2    1    0.012356   -0.130480   -0.087180    11.00000    0.02600    0.03208 =
         0.03310   -0.00368    0.00031   -0.00023
AFIX  43
H2A   2   -0.043882   -0.100263   -0.127744    11.00000   -1.20000
AFIX   0
C3    1    0.057496   -0.234680   -0.096524    11.00000    0.02886    0.03719 =
         0.04415   -0.01203    0.00481   -0.00051
AFIX  43
H3A   2    0.032891   -0.275477   -0.143028    11.00000   -1.20000
AFIX   0
C4    1    0.138332   -0.278303   -0.037667    11.00000    0.04401    0.02714 =
         0.06307   -0.00821    0.00078    0.01025
AFIX  43
H4A   2    0.167003   -0.350696   -0.042414    11.00000   -1.20000
AFIX   0
C5    1    0.178248   -0.217744    0.028354    11.00000    0.03819    0.03300 =
         0.05232    0.00297   -0.00927    0.01364
AFIX  43
H5A   2    0.236125   -0.248618    0.067759    11.00000   -1.20000
AFIX   0
C6    1    0.134872   -0.111102    0.038447    11.00000    0.02222    0.02784 =
         0.03247    0.00052   -0.00117   -0.00026
C7    1    0.300403    0.013614    0.082659    11.00000    0.03144    0.05647 =
         0.03712   -0.00191   -0.00134   -0.01221
AFIX  33
H7A   2    0.371545   -0.037163    0.068664    11.00000   -1.50000
H7B   2    0.329350    0.058484    0.128375    11.00000   -1.50000
H7C   2    0.280959    0.059197    0.035503    11.00000   -1.50000
AFIX   0
C8    1    0.202167   -0.106912    0.181452    11.00000    0.03340    0.04062 =
         0.03880    0.00879   -0.00615    0.00707
AFIX  23
H8A   2    0.283962   -0.150799    0.175186    11.00000   -1.20000
H8B   2    0.126255   -0.156392    0.190572    11.00000   -1.20000
AFIX   0
C9    1    0.217553   -0.034654    0.255165    11.00000    0.03443    0.06225 =
         0.03168    0.01177   -0.01380    0.00499
AFIX  23
H9A   2    0.234178   -0.078466    0.304416    11.00000   -1.20000
H9B   2    0.294387    0.014301    0.247376    11.00000   -1.20000
AFIX   0
C10   1    0.104767    0.111451    0.323684    11.00000    0.05212    0.05491 =
         0.02558   -0.00194   -0.00755   -0.00899
AFIX  23
H10A  2    0.164259    0.089740    0.368935    11.00000   -1.20000
H10B  2    0.014665    0.124390    0.346523    11.00000   -1.20000
AFIX   0
C11   1    0.156629    0.213822    0.286245    11.00000    0.04887    0.05183 =
         0.03743   -0.01045   -0.01331   -0.00914
AFIX  23
H11A  2    0.155042    0.272635    0.326752    11.00000   -1.20000
H11B  2    0.249724    0.203954    0.267317    11.00000   -1.20000
AFIX   0
C12   1    0.118189    0.329221    0.172984    11.00000    0.04219    0.02562 =
         0.04447   -0.00445   -0.00140   -0.01163
AFIX  23
H12A  2    0.215106    0.322251    0.162185    11.00000   -1.20000
H12B  2    0.103141    0.396387    0.203832    11.00000   -1.20000
AFIX   0
C13   1    0.043941    0.332476    0.095497    11.00000    0.03544    0.02441 =
         0.04219   -0.00670    0.00802   -0.00610
AFIX  23
H13A  2   -0.053258    0.337548    0.105958    11.00000   -1.20000
H13B  2    0.071640    0.395484    0.062903    11.00000   -1.20000
AFIX   0
C14   1    0.016968    0.230325   -0.026199    11.00000    0.05174    0.02293 =
         0.02874    0.00609    0.00387   -0.00657
AFIX  23
H14A  2    0.056505    0.286018   -0.061791    11.00000   -1.20000
H14B  2   -0.080696    0.242277   -0.023316    11.00000   -1.20000
AFIX   0
C15   1    0.046111    0.120325   -0.059615    11.00000    0.03544    0.02853 =
         0.02362    0.00311    0.00663   -0.00314
AFIX  23
H15A  2    0.009409    0.114591   -0.115423    11.00000   -1.20000
H15B  2    0.144011    0.109839   -0.062806    11.00000   -1.20000
AFIX   0
C16   1   -0.157914    0.031537   -0.022268    11.00000    0.02533    0.03683 =
         0.03112   -0.00295   -0.00121    0.00745
AFIX  33
H16A  2   -0.175267    0.011457   -0.078984    11.00000   -1.50000
H16B  2   -0.197138    0.102110   -0.011272    11.00000   -1.50000
H16C  2   -0.197965   -0.021863    0.014101    11.00000   -1.50000
 
HKLF 4
 
REM  jsib001 in P2(1)2(1)2(1)
REM R1 =  0.0471 for   3502 Fo > 4sig(Fo)  and  0.0718 for all   4674 data
REM    263 parameters refined using      0 restraints
 
END  
     
WGHT      0.0300      0.1628 
REM Highest difference peak  0.239,  deepest hole -0.258,  1-sigma level  0.054
Q1    1   0.0056  0.0787  0.0299  11.00000  0.05    0.24
Q2    1   0.2851  0.0819  0.1153  11.00000  0.05    0.22
Q3    1  -0.0008  0.2029  0.2567  11.00000  0.05    0.21
Q4    1   0.2728  0.0308  0.0158  11.00000  0.05    0.21
Q5    1   0.0865  0.0955 -0.1347  11.00000  0.05    0.21
Q6    1   0.0768 -0.0916  0.0156  11.00000  0.05    0.21
Q7    1   0.1772 -0.0631  0.1474  11.00000  0.05    0.20
Q8    1  -0.4854  0.1021  0.2183  11.00000  0.05    0.20
Q9    1  -0.1101  0.1510  0.2802  11.00000  0.05    0.19
Q10   1   0.0844  0.2516 -0.0003  11.00000  0.05    0.19
Q11   1   0.1194  0.1049  0.0616  11.00000  0.05    0.19
Q12   1   0.0538  0.0810  0.1963  11.00000  0.05    0.19
Q13   1  -0.0558  0.1170  0.2414  11.00000  0.05    0.19
Q14   1   0.1251 -0.2364 -0.0692  11.00000  0.05    0.18
Q15   1  -0.2599  0.0733  0.2542  11.00000  0.05    0.18
Q16   1   0.1247  0.2033  0.1070  11.00000  0.05    0.18
Q17   1  -0.2151  0.0379  0.2098  11.00000  0.05    0.18
Q18   1   0.3621 -0.2598 -0.0041  11.00000  0.05    0.18
Q19   1   0.0249  0.1849  0.0759  11.00000  0.05    0.18
Q20   1  -0.3885  0.0952  0.2384  11.00000  0.05    0.18
