TITL S555B  MOKA 50KV200MA 22C MON 260491
CELL  0.71073   8.55452  19.46850   9.43959    90.020   111.218    89.975
FACE    1.   0.   0.   0.0125
FACE    0.   0.   1.   0.0500
FACE    0.   1.   0.   0.2375
FACE   -1.   0.   0.   0.0125
FACE    0.   0.  -1.   0.0500
FACE    0.  -1.   0.   0.2375
HKLF 4
ABST     2.80
