TITL ABSTEST
CELL 1.5418 10.0006 11.0002 12.0012 95.81 101.31 106.8
FACE 1 0 0 1
FACE 0 1 1 1.5
FACE 0 -2 1 0.5
FACE -3 0 1 0.3
FACE 1 1 -4 1.3
HKLF 4
ABST 1.0
