TITL TEST1 INPUT FILE FOR PSICALC                                               
CELL  0.71069  7.6360  9.8767 18.9579  91.74  92.58 105.18                      
FACE   0.00  -0.01  -1.00  0.04032                                              
FACE   0.00   0.01   1.00  0.03678                                              
FACE  -1.00   1.05   1.17  0.03727                                              
FACE   1.00  -1.05  -1.17  0.08930                                              
FACE  -0.08  -1.00  -1.78  0.08127                                              
FACE  -0.03  -1.07  -1.00  0.09302                                              
FACE  -3.50   0.10  -1.00  0.05466                                              
FACE   0.04   1.20   1.00  0.09828                                              
HKLF 4
ABST  23.80                                                                     
