TITL S588A - GAUSSIAN
CELL 0.71073 11.1364 12.0577 15.3782 90 90 90
FACE 1 1 0 0.25
FACE -1 -1 0 0.25
FACE 0 0 1 0.25
FACE 0 0 -1 0.25
FACE -3 2 0 0.14
FACE 1 -1 0 0.15
HKLF 4
ABSG 8.73  10 10 10
